-- Convert schema 'upgrades/Tapper-Schema-TestrunDB-2.010024-MySQL.sql' to 'Tapper::Schema::TestrunDB v2.010028':;

BEGIN;

ALTER TABLE queue ADD COLUMN active integer(1) DEFAULT '0';

ALTER TABLE testrun DROP COLUMN test_program,
                    ADD COLUMN rerun_on_error integer(11) DEFAULT '0';

ALTER TABLE testrun_scheduling CHANGE COLUMN status status VARCHAR(255) DEFAULT 'prepare';


COMMIT;

